-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = -0.3614 RMS = 0.6433 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = -0.4008 RMS = 0.5888 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = -0.7265 RMS = 0.8204 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = -0.1254 RMS = 0.6021 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1072 Mean = -2.728 RMS = 4.457 Under = 42 Over = 0 Integ = 1030

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = -0.06887 RMS = 0.418 Under = 0 Over = 0 Integ = 1134

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = -0.4254 RMS = 0.5901 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1081 Mean = -0.1588 RMS = 0.5474 Under = 0 Over = 0 Integ = 1081