-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = 0.2264 RMS = 1.077 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1266 Mean = 0.1208 RMS = 1.101 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1279 Mean = 0.2805 RMS = 0.9693 Under = 0 Over = 0 Integ = 1279

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = 0.08525 RMS = 0.7195 Under = 0 Over = 1 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1276 Mean = 0.2403 RMS = 0.7872 Under = 0 Over = 0 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1270 Mean = -0.2852 RMS = 4.415 Under = 0 Over = 0 Integ = 1270

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1277 Mean = 0.0379 RMS = 3.359 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1276 Mean = 0.2787 RMS = 0.7021 Under = 0 Over = 0 Integ = 1276