-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1100 Mean = 0.01341 RMS = 0.1635 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1128 Mean = 0.1072 RMS = 0.2476 Under = 0 Over = 0 Integ = 1128

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1108 Mean = 0.3212 RMS = 0.3906 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1108 Mean = -0.09615 RMS = 0.203 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1080 Mean = 0.09451 RMS = 0.1807 Under = 0 Over = 0 Integ = 1080

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1136 Mean = -0.0049 RMS = 0.274 Under = 0 Over = 0 Integ = 1136

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1108 Mean = 0.03992 RMS = 0.1776 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1109 Mean = -0.01083 RMS = 0.1433 Under = 0 Over = 0 Integ = 1109