-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = -0.06517 RMS = 0.7969 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1266 Mean = -0.3798 RMS = 0.9911 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1279 Mean = -0.1296 RMS = 1.281 Under = 0 Over = 0 Integ = 1279

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = -0.1862 RMS = 0.757 Under = 1 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1276 Mean = -0.1724 RMS = 1.045 Under = 0 Over = 0 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1270 Mean = 0.08517 RMS = 4.306 Under = 0 Over = 0 Integ = 1270

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1277 Mean = -0.1306 RMS = 3.33 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1276 Mean = -0.2354 RMS = 0.7773 Under = 0 Over = 0 Integ = 1276