-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = -0.2286 RMS = 0.7219 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1269 Mean = -0.02666 RMS = 0.6658 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1280 Mean = -0.1161 RMS = 0.8115 Under = 0 Over = 0 Integ = 1280

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = 0.1435 RMS = 0.6548 Under = 0 Over = 0 Integ = 1275

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1277 Mean = -0.1261 RMS = 0.7298 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1271 Mean = -0.03579 RMS = 0.6282 Under = 0 Over = 0 Integ = 1271

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1278 Mean = -0.2152 RMS = 1.08 Under = 0 Over = 0 Integ = 1278

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1277 Mean = 0.04545 RMS = 0.7401 Under = 0 Over = 0 Integ = 1277