-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1100 Mean = -0.1092 RMS = 0.1782 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1128 Mean = -0.03543 RMS = 0.122 Under = 0 Over = 0 Integ = 1128

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1108 Mean = 0.03492 RMS = 0.1281 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1108 Mean = 0.0004449 RMS = 0.1218 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1081 Mean = 0.01452 RMS = 0.1282 Under = 0 Over = 0 Integ = 1081

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1141 Mean = -0.004117 RMS = 0.1152 Under = 0 Over = 0 Integ = 1141

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1108 Mean = 0.1197 RMS = 0.1624 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1109 Mean = -0.07816 RMS = 0.1254 Under = 0 Over = 0 Integ = 1109