-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = 0.2633 RMS = 0.5421 Under = 0 Over = 0 Integ = 1274

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1267 Mean = 0.05489 RMS = 0.5021 Under = 0 Over = 0 Integ = 1267

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1279 Mean = 0.03157 RMS = 0.5046 Under = 0 Over = 0 Integ = 1279

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = 0.1914 RMS = 0.5464 Under = 0 Over = 0 Integ = 1275

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1276 Mean = 0.02962 RMS = 0.5939 Under = 0 Over = 0 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1271 Mean = 0.01711 RMS = 0.6155 Under = 0 Over = 0 Integ = 1271

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1277 Mean = 0.03089 RMS = 0.6368 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1276 Mean = -0.0726 RMS = 0.5562 Under = 0 Over = 0 Integ = 1276