-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = 0.07379 RMS = 0.2289 Under = 0 Over = 0 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1266 Mean = -0.05757 RMS = 0.2573 Under = 1 Over = 0 Integ = 1265

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1279 Mean = 0.0766 RMS = 0.3088 Under = 0 Over = 0 Integ = 1279

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = 0.2071 RMS = 0.3463 Under = 0 Over = 0 Integ = 1275

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = 0.1445 RMS = 0.3159 Under = 0 Over = 0 Integ = 1276

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1270 Mean = 0.2563 RMS = 0.2888 Under = 0 Over = 0 Integ = 1270

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1277 Mean = 0.1556 RMS = 0.2409 Under = 0 Over = 0 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1276 Mean = 0.0434 RMS = 0.2572 Under = 0 Over = 0 Integ = 1276