-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1101 Mean = -0.03211 RMS = 0.4292 Under = 0 Over = 0 Integ = 1101

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = 0.05173 RMS = 0.3876 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1109 Mean = 0.1548 RMS = 0.3276 Under = 0 Over = 0 Integ = 1109

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1108 Mean = 0.133 RMS = 0.2798 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1083 Mean = 0.1836 RMS = 0.2847 Under = 0 Over = 0 Integ = 1083

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1139 Mean = 0.0721 RMS = 0.3136 Under = 0 Over = 0 Integ = 1139

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1108 Mean = -0.1628 RMS = 0.4042 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1109 Mean = -0.09035 RMS = 0.7859 Under = 0 Over = 0 Integ = 1109