-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1264 Mean = -0.05985 RMS = 0.1718 Under = 0 Over = 0 Integ = 1264

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1255 Mean = 0.06478 RMS = 0.1699 Under = 0 Over = 0 Integ = 1255

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1269 Mean = -0.2169 RMS = 0.3676 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1266 Mean = 0.04526 RMS = 0.1955 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1266 Mean = -0.03018 RMS = 0.1711 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1261 Mean = -0.06384 RMS = 0.2207 Under = 0 Over = 0 Integ = 1261

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

10^3

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1266 Mean = 0.04521 RMS = 0.139 Under = 0 Over = 0 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1261 Mean = -0.05536 RMS = 0.1675 Under = 0 Over = 0 Integ = 1261