-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1109 Mean = -0.0307 RMS = 0.162 Under = 0 Over = 0 Integ = 1109

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1134 Mean = -0.01995 RMS = 0.1358 Under = 28 Over = 0 Integ = 1106

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1113 Mean = -0.06881 RMS = 0.1651 Under = 0 Over = 0 Integ = 1113

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1112 Mean = 0.1682 RMS = 0.2004 Under = 0 Over = 0 Integ = 1112

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1101 Mean = -0.02799 RMS = 0.1412 Under = 0 Over = 0 Integ = 1101

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1142 Mean = -0.02483 RMS = 0.1292 Under = 0 Over = 0 Integ = 1142

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1110 Mean = -0.1039 RMS = 0.1541 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1123 Mean = -0.06627 RMS = 0.1633 Under = 0 Over = 0 Integ = 1123