-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1110 Mean = 0.1054 RMS = 0.4893 Under = 0 Over = 0 Integ = 1110

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1134 Mean = 0.2309 RMS = 1.532 Under = 0 Over = 2 Integ = 1132

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1114 Mean = -0.1049 RMS = 0.4938 Under = 0 Over = 0 Integ = 1114

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1112 Mean = 0.1132 RMS = 0.3481 Under = 0 Over = 0 Integ = 1112

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1101 Mean = -0.03126 RMS = 0.3598 Under = 0 Over = 0 Integ = 1101

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1144 Mean = 0.07786 RMS = 0.3752 Under = 0 Over = 0 Integ = 1144

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1110 Mean = 0.1154 RMS = 0.5283 Under = 0 Over = 0 Integ = 1110

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1123 Mean = -0.05361 RMS = 0.4849 Under = 0 Over = 0 Integ = 1123