-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1274 Mean = -0.5571 RMS = 0.6158 Under = 0 Over = 1 Integ = 1273

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1266 Mean = -0.3424 RMS = 1.001 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1279 Mean = -0.6249 RMS = 1.16 Under = 0 Over = 1 Integ = 1278

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1275 Mean = -0.4244 RMS = 0.6734 Under = 0 Over = 0 Integ = 1275

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1276 Mean = -0.2673 RMS = 0.6922 Under = 0 Over = 0 Integ = 1276

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1270 Mean = -0.1943 RMS = 4.292 Under = 0 Over = 0 Integ = 1270

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1277 Mean = -0.3381 RMS = 3.646 Under = 0 Over = 0 Integ = 1277

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1276 Mean = -0.7039 RMS = 0.8434 Under = 0 Over = 0 Integ = 1276