-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1080 Mean = 0.1212 RMS = 0.4615 Under = 0 Over = 1 Integ = 1079

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 630 Mean = 0.113 RMS = 0.3906 Under = 0 Over = 6 Integ = 624

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = 0.4646 RMS = 0.5958 Under = 0 Over = 2 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1104 Mean = 0.1194 RMS = 0.329 Under = 0 Over = 0 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1066 Mean = 0.1151 RMS = 0.3671 Under = 0 Over = 0 Integ = 1066

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1136 Mean = 0.1705 RMS = 0.5095 Under = 0 Over = 9 Integ = 1127

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1104 Mean = 0.05318 RMS = 0.7517 Under = 34 Over = 2 Integ = 1068

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1107 Mean = 0.04024 RMS = 0.6941 Under = 2 Over = 5 Integ = 1100