-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1087 Mean = -0.02508 RMS = 0.3242 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = 0.04463 RMS = 0.3799 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1105 Mean = 0.2236 RMS = 0.3771 Under = 0 Over = 0 Integ = 1105

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = -0.1482 RMS = 0.4992 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1074 Mean = 0.01693 RMS = 0.3573 Under = 0 Over = 0 Integ = 1074

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1135 Mean = -0.2561 RMS = 0.3829 Under = 0 Over = 0 Integ = 1135

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = 0.03385 RMS = 0.368 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1080 Mean = 0.06869 RMS = 0.3809 Under = 0 Over = 0 Integ = 1080