-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1108 Mean = -0.2203 RMS = 0.4437 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1133 Mean = -0.09063 RMS = 0.4706 Under = 0 Over = 0 Integ = 1133

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1114 Mean = -0.225 RMS = 0.4947 Under = 0 Over = 0 Integ = 1114

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1110 Mean = -0.1526 RMS = 0.5781 Under = 0 Over = 0 Integ = 1110

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1092 Mean = -0.08265 RMS = 0.5375 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1143 Mean = -0.2726 RMS = 0.5383 Under = 0 Over = 0 Integ = 1143

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1110 Mean = -0.06556 RMS = 0.5576 Under = 0 Over = 0 Integ = 1110

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1117 Mean = -0.1756 RMS = 0.5157 Under = 0 Over = 0 Integ = 1117