-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1280 Mean = -0.9483 RMS = 0.8114 Under = 1 Over = 0 Integ = 1279

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1260 Mean = -0.9423 RMS = 0.8647 Under = 0 Over = 0 Integ = 1260

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1271 Mean = 0.4023 RMS = 1.052 Under = 1 Over = 53 Integ = 1217

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = 0.4263 RMS = 0.9466 Under = 0 Over = 7 Integ = 1268

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = -1.259 RMS = 1.167 Under = 349 Over = 0 Integ = 927

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1251 Mean = -1.466 RMS = 1.479 Under = 524 Over = 0 Integ = 727

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1266 Mean = -0.2047 RMS = 0.8637 Under = 35 Over = 0 Integ = 1231

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1266 Mean = 0.4922 RMS = 0.525 Under = 0 Over = 0 Integ = 1266