-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1145 Mean = -0.1308 RMS = 0.2261 Under = 0 Over = 0 Integ = 1145

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1136 Mean = -0.02042 RMS = 0.1661 Under = 0 Over = 0 Integ = 1136

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1150 Mean = -0.1531 RMS = 0.2419 Under = 0 Over = 0 Integ = 1150

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1146 Mean = -0.1018 RMS = 0.1799 Under = 0 Over = 0 Integ = 1146

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1146 Mean = -0.1714 RMS = 0.2089 Under = 0 Over = 0 Integ = 1146

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1150 Mean = 0.0584 RMS = 0.2735 Under = 0 Over = 0 Integ = 1150

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1149 Mean = 0.04249 RMS = 0.1406 Under = 0 Over = 0 Integ = 1149

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1149 Mean = 0.04026 RMS = 0.1473 Under = 0 Over = 0 Integ = 1149