-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1145 Mean = 0.7424 RMS = 0.5576 Under = 0 Over = 0 Integ = 1145

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1136 Mean = 0.7136 RMS = 0.3381 Under = 0 Over = 0 Integ = 1136

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1150 Mean = 0.66 RMS = 0.4085 Under = 0 Over = 0 Integ = 1150

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1146 Mean = 0.7245 RMS = 0.5043 Under = 0 Over = 0 Integ = 1146

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1146 Mean = 0.6186 RMS = 0.4121 Under = 0 Over = 0 Integ = 1146

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1150 Mean = 0.8332 RMS = 0.43 Under = 0 Over = 0 Integ = 1150

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1149 Mean = 0.5977 RMS = 0.4177 Under = 0 Over = 0 Integ = 1149

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1149 Mean = 0.5169 RMS = 0.3988 Under = 0 Over = 0 Integ = 1149