-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1086 Mean = -0.02209 RMS = 0.1421 Under = 0 Over = 0 Integ = 1086

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1129 Mean = -0.04026 RMS = 0.1175 Under = 0 Over = 0 Integ = 1129

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1106 Mean = 0.007519 RMS = 0.1647 Under = 0 Over = 0 Integ = 1106

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1092 Mean = 0.02518 RMS = 0.1628 Under = 0 Over = 0 Integ = 1092

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1073 Mean = -0.06102 RMS = 0.26 Under = 0 Over = 0 Integ = 1073

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1134 Mean = -0.04765 RMS = 0.115 Under = 0 Over = 0 Integ = 1134

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = 0.0238 RMS = 0.142 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1081 Mean = 0.03051 RMS = 0.18 Under = 0 Over = 0 Integ = 1081