-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1087 Mean = 0.06433 RMS = 0.184 Under = 0 Over = 0 Integ = 1087

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1127 Mean = -0.009177 RMS = 0.1812 Under = 0 Over = 0 Integ = 1127

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1105 Mean = -0.1118 RMS = 0.1719 Under = 0 Over = 0 Integ = 1105

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1092 Mean = -0.2512 RMS = 0.5751 Under = 0 Over = 0 Integ = 1092

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1074 Mean = 0.05215 RMS = 0.1349 Under = 0 Over = 0 Integ = 1074

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1130 Mean = -0.1099 RMS = 0.3558 Under = 0 Over = 0 Integ = 1130

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = -0.04795 RMS = 0.1491 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1080 Mean = -0.007621 RMS = 0.1206 Under = 0 Over = 0 Integ = 1080