-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1087 Mean = 0.1739 RMS = 0.355 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = 0.296 RMS = 0.3309 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1105 Mean = -0.04566 RMS = 0.4035 Under = 0 Over = 0 Integ = 1105

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1091 Mean = 0.09625 RMS = 0.4851 Under = 0 Over = 0 Integ = 1091

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1073 Mean = 0.1213 RMS = 0.3241 Under = 0 Over = 0 Integ = 1073

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = 0.304 RMS = 0.3108 Under = 0 Over = 127 Integ = 1007

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = 0.08648 RMS = 0.3902 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1080 Mean = 0.3104 RMS = 0.3353 Under = 0 Over = 0 Integ = 1080