-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1103 Mean = -0.5308 RMS = 0.4246 Under = 0 Over = 0 Integ = 1103

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = -0.6307 RMS = 0.4794 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1114 Mean = -0.6239 RMS = 0.5543 Under = 0 Over = 0 Integ = 1114

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1109 Mean = -0.7196 RMS = 0.4934 Under = 0 Over = 0 Integ = 1109

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1087 Mean = -0.6739 RMS = 0.47 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1143 Mean = -0.5725 RMS = 0.4079 Under = 0 Over = 0 Integ = 1143

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1108 Mean = -0.5673 RMS = 0.5021 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1113 Mean = -0.6608 RMS = 0.5658 Under = 0 Over = 0 Integ = 1113