-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = -0.2138 RMS = 0.7082 Under = 0 Over = 2 Integ = 1272

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1267 Mean = -0.09701 RMS = 0.5913 Under = 0 Over = 1 Integ = 1266

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1279 Mean = 0.5535 RMS = 0.3142 Under = 0 Over = 2 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = 0.2631 RMS = 0.2957 Under = 0 Over = 2 Integ = 1273

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = 0.361 RMS = 0.2964 Under = 0 Over = 2 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1271 Mean = 0.4993 RMS = 0.4525 Under = 0 Over = 3 Integ = 1268

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1278 Mean = 0.8271 RMS = 0.5784 Under = 0 Over = 4 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1276 Mean = 0.1299 RMS = 0.2916 Under = 0 Over = 2 Integ = 1274