-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1101 Mean = 0.03713 RMS = 0.5897 Under = 0 Over = 0 Integ = 1101

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = 0.08575 RMS = 0.4041 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1109 Mean = 0.2983 RMS = 0.5625 Under = 0 Over = 0 Integ = 1109

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1108 Mean = 0.1087 RMS = 0.4554 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1084 Mean = -0.0259 RMS = 0.4987 Under = 0 Over = 0 Integ = 1084

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1143 Mean = -0.01737 RMS = 0.6815 Under = 0 Over = 0 Integ = 1143

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1108 Mean = 0.08022 RMS = 0.4288 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1109 Mean = 0.08599 RMS = 0.4795 Under = 0 Over = 0 Integ = 1109