-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = 0.4306 RMS = 0.5014 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = 0.8211 RMS = 0.4357 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1106 Mean = 0.6034 RMS = 0.6274 Under = 0 Over = 0 Integ = 1106

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1092 Mean = 0.6286 RMS = 0.4033 Under = 0 Over = 0 Integ = 1092

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1073 Mean = 0.5632 RMS = 0.3281 Under = 0 Over = 0 Integ = 1073

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1134 Mean = 0.5103 RMS = 0.3119 Under = 0 Over = 0 Integ = 1134

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = 0.4623 RMS = 0.3988 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1081 Mean = 0.5052 RMS = 0.3863 Under = 0 Over = 0 Integ = 1081