-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1103 Mean = 0.1224 RMS = 0.4987 Under = 0 Over = 0 Integ = 1103

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1129 Mean = 0.07371 RMS = 0.5479 Under = 0 Over = 0 Integ = 1129

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1114 Mean = 0.3447 RMS = 0.5191 Under = 0 Over = 0 Integ = 1114

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1109 Mean = 0.1845 RMS = 0.4815 Under = 0 Over = 0 Integ = 1109

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1087 Mean = 0.09168 RMS = 0.4744 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 1143 Mean = 0.172 RMS = 0.5231 Under = 0 Over = 0 Integ = 1143

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1108 Mean = 0.3324 RMS = 0.5672 Under = 0 Over = 0 Integ = 1108

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1113 Mean = 0.1806 RMS = 0.537 Under = 0 Over = 0 Integ = 1113