-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = -0.1251 RMS = 0.2553 Under = 0 Over = 1 Integ = 1273

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1269 Mean = -0.01974 RMS = 0.2744 Under = 0 Over = 0 Integ = 1269

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1280 Mean = 0.1428 RMS = 0.4767 Under = 0 Over = 0 Integ = 1280

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = -0.07551 RMS = 0.2152 Under = 0 Over = 0 Integ = 1275

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1277 Mean = -0.0508 RMS = 0.2214 Under = 0 Over = 0 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1271 Mean = -0.07579 RMS = 0.2381 Under = 0 Over = 0 Integ = 1271

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1278 Mean = 0.02888 RMS = 0.2414 Under = 0 Over = 0 Integ = 1278

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1277 Mean = -0.08095 RMS = 0.305 Under = 0 Over = 0 Integ = 1277