-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1274 Mean = -0.1714 RMS = 0.1896 Under = 0 Over = 0 Integ = 1274

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1267 Mean = 0.02296 RMS = 0.2029 Under = 0 Over = 0 Integ = 1267

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1279 Mean = -0.123 RMS = 0.2253 Under = 0 Over = 0 Integ = 1279

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1275 Mean = 0.008615 RMS = 0.3244 Under = 0 Over = 0 Integ = 1275

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1276 Mean = -0.1819 RMS = 0.2646 Under = 0 Over = 0 Integ = 1276

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1271 Mean = -0.1212 RMS = 0.2156 Under = 0 Over = 0 Integ = 1271

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1277 Mean = -0.1036 RMS = 0.1898 Under = 0 Over = 0 Integ = 1277

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1276 Mean = -0.1214 RMS = 0.1961 Under = 0 Over = 0 Integ = 1276