-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1102 Mean = -0.04294 RMS = 0.1355 Under = 0 Over = 0 Integ = 1102

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1129 Mean = -0.05298 RMS = 0.1463 Under = 0 Over = 0 Integ = 1129

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1113 Mean = -0.04305 RMS = 0.1311 Under = 0 Over = 0 Integ = 1113

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1109 Mean = -0.009971 RMS = 0.1626 Under = 0 Over = 0 Integ = 1109

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1084 Mean = 0.0009751 RMS = 0.1323 Under = 0 Over = 0 Integ = 1084

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1141 Mean = -0.06542 RMS = 0.1269 Under = 0 Over = 0 Integ = 1141

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1108 Mean = -0.04569 RMS = 0.1313 Under = 0 Over = 0 Integ = 1108

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1113 Mean = 0.07943 RMS = 0.2252 Under = 0 Over = 0 Integ = 1113