-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1087 Mean = -0.3492 RMS = 0.4743 Under = 0 Over = 0 Integ = 1087

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = -0.175 RMS = 0.5455 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1105 Mean = 0.2894 RMS = 0.6382 Under = 0 Over = 0 Integ = 1105

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1090 Mean = -0.4898 RMS = 0.3958 Under = 0 Over = 0 Integ = 1090

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1071 Mean = -0.2545 RMS = 0.4612 Under = 0 Over = 0 Integ = 1071

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 882 Mean = -0.3495 RMS = 0.3634 Under = 0 Over = 0 Integ = 882

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = -0.4662 RMS = 0.5707 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1080 Mean = -0.4243 RMS = 0.4985 Under = 0 Over = 0 Integ = 1080