-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1086 Mean = 0.06351 RMS = 0.1285 Under = 0 Over = 0 Integ = 1086

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1127 Mean = -0.06758 RMS = 0.204 Under = 0 Over = 0 Integ = 1127

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1105 Mean = -0.1531 RMS = 0.2204 Under = 0 Over = 0 Integ = 1105

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1089 Mean = -0.1026 RMS = 0.1768 Under = 0 Over = 0 Integ = 1089

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1071 Mean = 0.02304 RMS = 0.1282 Under = 0 Over = 0 Integ = 1071

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 882 Mean = -0.02713 RMS = 0.1249 Under = 0 Over = 0 Integ = 882

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1100 Mean = -0.06662 RMS = 0.1506 Under = 0 Over = 0 Integ = 1100

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1080 Mean = 0.007699 RMS = 0.1153 Under = 0 Over = 0 Integ = 1080