-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = -0.1472 RMS = 0.448 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = 0.2462 RMS = 0.471 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1105 Mean = -0.2837 RMS = 0.4524 Under = 0 Over = 0 Integ = 1105

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1089 Mean = 0.1873 RMS = 0.3359 Under = 0 Over = 0 Integ = 1089

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1071 Mean = 0.00915 RMS = 0.2936 Under = 0 Over = 0 Integ = 1071

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 882 Mean = 0.01714 RMS = 0.2969 Under = 0 Over = 0 Integ = 882

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = 0.1037 RMS = 0.3607 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1080 Mean = 0.0602 RMS = 0.377 Under = 0 Over = 0 Integ = 1080