-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 1259 Mean = -0.4083 RMS = 1.004 Under = 275 Over = 0 Integ = 984

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 1251 Mean = -0.4501 RMS = 1.079 Under = 271 Over = 0 Integ = 980

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 1247 Mean = -0.6654 RMS = 0.9909 Under = 273 Over = 0 Integ = 974

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 1260 Mean = -0.6601 RMS = 1.108 Under = 263 Over = 0 Integ = 997

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 1250 Mean = -1.837 RMS = 1.63 Under = 344 Over = 0 Integ = 906

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 1257 Mean = -0.5006 RMS = 0.9225 Under = 241 Over = 0 Integ = 1016

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 1249 Mean = -0.6604 RMS = 0.8647 Under = 304 Over = 0 Integ = 945

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 1246 Mean = -0.5869 RMS = 0.9179 Under = 283 Over = 0 Integ = 963