-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-0_{drmsHist_s1o0}

Nent = 1110 Mean = 0.07711 RMS = 0.1851 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-1_{drmsHist_s1o1}

Nent = 1137 Mean = 0.03789 RMS = 0.1476 Under = 0 Over = 0 Integ = 1137

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-2_{drmsHist_s1o2}

Nent = 1113 Mean = 0.1354 RMS = 0.8462 Under = 80 Over = 0 Integ = 1033

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-3_{drmsHist_s1o3}

Nent = 1114 Mean = -0.02058 RMS = 0.126 Under = 0 Over = 0 Integ = 1114

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-4_{drmsHist_s1o4}

Nent = 1104 Mean = 0.03752 RMS = 0.1475 Under = 0 Over = 0 Integ = 1104

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-5_{drmsHist_s1o5}

Nent = 1145 Mean = -0.2977 RMS = 0.879 Under = 1 Over = 0 Integ = 1144

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-6_{drmsHist_s1o6}

Nent = 1110 Mean = 0.05769 RMS = 0.1605 Under = 0 Over = 0 Integ = 1110

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-1 Oct-7_{drmsHist_s1o7}

Nent = 1123 Mean = 0.06238 RMS = 0.1609 Under = 0 Over = 0 Integ = 1123