-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 1086 Mean = 0.05978 RMS = 0.9888 Under = 0 Over = 0 Integ = 1086

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 1127 Mean = 0.3551 RMS = 1.22 Under = 0 Over = 0 Integ = 1127

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 1105 Mean = 0.08382 RMS = 1.086 Under = 0 Over = 0 Integ = 1105

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 1089 Mean = -0.09845 RMS = 1.016 Under = 0 Over = 0 Integ = 1089

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 1069 Mean = 0.06255 RMS = 0.8143 Under = 0 Over = 0 Integ = 1069

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 881 Mean = 0.004493 RMS = 1.063 Under = 0 Over = 0 Integ = 881

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 1100 Mean = -0.08528 RMS = 1.004 Under = 0 Over = 0 Integ = 1100

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 1080 Mean = -0.05291 RMS = 1.55 Under = 0 Over = 0 Integ = 1080