-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 1262 Mean = 0.2411 RMS = 0.5809 Under = 0 Over = 0 Integ = 1262

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 1254 Mean = -0.1752 RMS = 0.6468 Under = 0 Over = 0 Integ = 1254

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 1269 Mean = 0.04153 RMS = 0.6699 Under = 0 Over = 0 Integ = 1269

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 1266 Mean = -0.2722 RMS = 0.5481 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 1266 Mean = 0.3281 RMS = 0.6479 Under = 0 Over = 0 Integ = 1266

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 1260 Mean = 0.3496 RMS = 0.477 Under = 0 Over = 0 Integ = 1260

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 1262 Mean = 0.1922 RMS = 1.188 Under = 0 Over = 0 Integ = 1262

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 1261 Mean = 0.07459 RMS = 0.8898 Under = 0 Over = 0 Integ = 1261