0 50 100 150 200 250 300

-100

-50

0

50

100

StripPar0_0 Nent = 0 Mean = 115.8 RMS = 73.21

Intercept vrs Strip - Sta2 Oct3 Pla0 _{StripPar0_0}

0 50 100 150 200 250 300

-100

-50

0

50

100

StripPar0_1 Nent = 0 Mean = 115.5 RMS = 72.81

Intercept vrs Strip - Sta2 Oct3 Pla1 _{StripPar0_1}

0 50 100 150 200 250 300

-50

0

50

100

150 StripPar0_2 Nent = 0 Mean = 111.3 RMS = 78.02

Intercept vrs Strip - Sta2 Oct3 Pla2 _{StripPar0_2}

0 50 100 150 200 250 300

-100

-50

0

50

100

150 StripPar0_3 Nent = 0 Mean = 113.8 RMS = 78.24

Intercept vrs Strip - Sta2 Oct3 Pla3 _{StripPar0_3}