-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 952 Mean = 0.07723 RMS = 0.2019 Under = 0 Over = 0 Integ = 952

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 956 Mean = 0.01468 RMS = 0.1868 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = 0.1685 RMS = 0.365 Under = 0 Over = 16 Integ = 941

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 959 Mean = 0.3732 RMS = 0.4692 Under = 0 Over = 0 Integ = 959

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 955 Mean = 0.06832 RMS = 0.2211 Under = 0 Over = 0 Integ = 955

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 954 Mean = 0.05203 RMS = 0.1997 Under = 0 Over = 0 Integ = 954

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 950 Mean = 0.06328 RMS = 0.2205 Under = 0 Over = 0 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 950 Mean = -0.02191 RMS = 0.2793 Under = 0 Over = 0 Integ = 950