-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-0_{drmsHist_s2o0}

Nent = 952 Mean = -0.03498 RMS = 0.2306 Under = 0 Over = 0 Integ = 952

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-1_{drmsHist_s2o1}

Nent = 956 Mean = 0.06118 RMS = 0.2185 Under = 0 Over = 0 Integ = 956

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-2_{drmsHist_s2o2}

Nent = 957 Mean = 0.04231 RMS = 0.3502 Under = 1 Over = 16 Integ = 940

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-3_{drmsHist_s2o3}

Nent = 959 Mean = -0.1614 RMS = 0.3415 Under = 0 Over = 0 Integ = 959

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-4_{drmsHist_s2o4}

Nent = 955 Mean = 0.03288 RMS = 0.2148 Under = 0 Over = 0 Integ = 955

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-5_{drmsHist_s2o5}

Nent = 954 Mean = -0.02154 RMS = 0.2347 Under = 0 Over = 0 Integ = 954

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-6_{drmsHist_s2o6}

Nent = 950 Mean = -0.1304 RMS = 0.2891 Under = 0 Over = 0 Integ = 950

-5 -4 -3 -2 -1 0 1 2 3 4 5

1

10

10^2

Rms Difference for Sta-2 Oct-7_{drmsHist_s2o7}

Nent = 950 Mean = -0.05452 RMS = 0.4049 Under = 0 Over = 0 Integ = 950