-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 960 Mean = 0.03979 RMS = 0.3041 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 960 Mean = -0.1423 RMS = 0.273 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 960 Mean = 0.04308 RMS = 0.3169 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 960 Mean = 0.007838 RMS = 0.316 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 960 Mean = -0.001196 RMS = 0.3952 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 960 Mean = -0.09533 RMS = 0.3683 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 960 Mean = -0.125 RMS = 0.3087 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 960 Mean = -0.1495 RMS = 0.5983 Under = 0 Over = 0 Integ = 960