-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-0_{dpedHist_s2o0}

Nent = 960 Mean = 0.2136 RMS = 0.3893 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-1_{dpedHist_s2o1}

Nent = 960 Mean = 0.07698 RMS = 0.3408 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-2_{dpedHist_s2o2}

Nent = 960 Mean = 0.1386 RMS = 0.5333 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-3_{dpedHist_s2o3}

Nent = 960 Mean = 0.07733 RMS = 0.5301 Under = 30 Over = 0 Integ = 930

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-4_{dpedHist_s2o4}

Nent = 960 Mean = 0.07277 RMS = 0.375 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-5_{dpedHist_s2o5}

Nent = 960 Mean = 0.1373 RMS = 0.3363 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-2 Oct-6_{dpedHist_s2o6}

Nent = 960 Mean = 0.03249 RMS = 0.3909 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-2 Oct-7_{dpedHist_s2o7}

Nent = 960 Mean = 0.2222 RMS = 0.4181 Under = 0 Over = 0 Integ = 960