0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_0 Nent = 0 Mean = 88.83 RMS = 43.91

Intercept vrs Strip - Sta1 Oct6 Pla0 StripPar0_0

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_1 Nent = 0 Mean = 56.2 RMS = 40.99

Intercept vrs Strip - Sta1 Oct6 Pla1 StripPar0_1

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100 StripPar0_2 Nent = 0 Mean = 60.66 RMS = 43.74

Intercept vrs Strip - Sta1 Oct6 Pla2 StripPar0_2

0 20 40 60 80 100 120 140 160 180

-100 -80 -60 -40 -20 0 20 40 60

StripPar0_3 Nent = 0 Mean = 64.2 RMS = 44.02

Intercept vrs Strip - Sta1 Oct6 Pla3 StripPar0_3

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_4 Nent = 0 Mean = 92.31 RMS = 42.87

Intercept vrs Strip - Sta1 Oct6 Pla4 StripPar0_4

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_5 Nent = 0 Mean = 65.94 RMS = 43.64

Intercept vrs Strip - Sta1 Oct6 Pla5 StripPar0_5