0 50 100 150 200 250 300

-150

-100

-50

0

50

100

StripPar0_0 Nent = 0 Mean = 100.4 RMS = 65.53

Intercept vrs Strip - Sta2 Oct5 Pla0 _{StripPar0_0}

0 50 100 150 200 250 300

-150

-100

-50

0

50

100

StripPar0_1 Nent = 0 Mean = 95.13 RMS = 59.93

Intercept vrs Strip - Sta2 Oct5 Pla1 _{StripPar0_1}

0 50 100 150 200 250 300

-150

-100

-50

0

50

StripPar0_2 Nent = 0 Mean = 96.91 RMS = 69.36

Intercept vrs Strip - Sta2 Oct5 Pla2 _{StripPar0_2}

0 50 100 150 200 250 300

-150

-100

-50

0

50

StripPar0_3 Nent = 0 Mean = 98.25 RMS = 68.75

Intercept vrs Strip - Sta2 Oct5 Pla3 _{StripPar0_3}