0 20 40 60 80 100 120 140 160 180 -80 -60 -40 -20 0 20 40 60

StripPar0_0 Nent = 0 Mean = 115.2 RMS = 23.2

Intercept vrs Strip - Sta1 Oct3 Pla0 StripPar0_0

0 20 40 60 80 100 120 140 160 180

-120

-100 -80 -60 -40 -20 0 20

StripPar0_1 Nent = 0 Mean = 125.4 RMS = 18.36

Intercept vrs Strip - Sta1 Oct3 Pla1 StripPar0_1

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_2 Nent = 0 Mean = 115.4 RMS = 15.97

Intercept vrs Strip - Sta1 Oct3 Pla2 StripPar0_2

0 20 40 60 80 100 120 140 160 180 -60 -40 -20 0 20 40 60 80 StripPar0_3 Nent = 0 Mean = 120.6 RMS = 21.37

Intercept vrs Strip - Sta1 Oct3 Pla3 StripPar0_3

0 20 40 60 80 100 120 140 160 180 -40 -30 -20 -10 0 10 20 30 40 50 StripPar0_4 Nent = 0 Mean = 113.6 RMS = 20.43

Intercept vrs Strip - Sta1 Oct3 Pla4 StripPar0_4

0 20 40 60 80 100 120 140 160 180

-50

0

50

100

150 StripPar0_5 Nent = 0 Mean = 115.9 RMS = 19.41

Intercept vrs Strip - Sta1 Oct3 Pla5 StripPar0_5