-30 -20 -10 0 10 20 30 0 50 100 150 200 250 300 350

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 960 Mean = 0.2804 RMS = 0.6534 Under = 0 Over = 1 Integ = 959

-30 -20 -10 0 10 20 30 0 50 100 150 200 250 300 350 400 450

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 960 Mean = 0.1821 RMS = 0.5168 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30 0 50 100 150 200 250 300 350 400 450 Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 960 Mean = -0.08189 RMS = 0.4008 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30 0

50

100

150

200

250

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 720 Mean = -0.4654 RMS = 0.6131 Under = 0 Over = 0 Integ = 720

-30 -20 -10 0 10 20 30 0

100

200

300

400

500

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 960 Mean = -0.3082 RMS = 0.4944 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30 0 50 100 150 200 250 300 350

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 960 Mean = -0.9645 RMS = 0.5507 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30 0

100

200

300

400

500

600 Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 960 Mean = -0.9657 RMS = 3.444 Under = 6 Over = 0 Integ = 954

-30 -20 -10 0 10 20 30 0

100

200

300

400

500

600 Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 960 Mean = -0.3085 RMS = 0.3701 Under = 0 Over = 0 Integ = 960