0 20 40 60 80 100 120 140 160 180 0 2 4 6 8 10 12 14 16

StripPar1_0 Nent = 0 Mean = 80.15 RMS = 46.23

Slope vrs Strip - Sta1 Oct7 Pla0 StripPar1_0

0 20 40 60 80 100 120 140 160 180 0 2 4 6 8 10 12 14 StripPar1_1 Nent = 0 Mean = 78.03 RMS = 46.64

Slope vrs Strip - Sta1 Oct7 Pla1 StripPar1_1

0 20 40 60 80 100 120 140 160 180 0 2 4 6 8 10 12 14 StripPar1_2 Nent = 0 Mean = 80.56 RMS = 46.31

Slope vrs Strip - Sta1 Oct7 Pla2 StripPar1_2

0 20 40 60 80 100 120 140 160 180 0 2 4 6 8 10 12 14 16 18 20 StripPar1_3 Nent = 0 Mean = 79.07 RMS = 47.41

Slope vrs Strip - Sta1 Oct7 Pla3 StripPar1_3

0 20 40 60 80 100 120 140 160 180 -2 0 2 4 6 8 10 12 14 16 18

StripPar1_4 Nent = 0 Mean = 80.94 RMS = 47.02

Slope vrs Strip - Sta1 Oct7 Pla4 StripPar1_4

0 20 40 60 80 100 120 140 160 180 0 2 4 6 8 10 12 14 16 18 StripPar1_5 Nent = 0 Mean = 79.25 RMS = 44.89

Slope vrs Strip - Sta1 Oct7 Pla5 StripPar1_5