0 20 40 60 80 100 120 140 160 180

-200

-150

-100

-50

0

50

StripPar0_0 Nent = 0 Mean = 110.7 RMS = 37.36

Intercept vrs Strip - Sta1 Oct0 Pla0 StripPar0_0

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

StripPar0_1 Nent = 0 Mean = 87.04 RMS = 43.37

Intercept vrs Strip - Sta1 Oct0 Pla1 StripPar0_1

0 20 40 60 80 100 120 140 160 180

-100

-50

0

50

100

150 StripPar0_2 Nent = 0 Mean = 73.3 RMS = 45.67

Intercept vrs Strip - Sta1 Oct0 Pla2 StripPar0_2

0 20 40 60 80 100 120 140 160 180

-250

-200

-150

-100 -50 0 50 100 150 StripPar0_3 Nent = 0 Mean = 107.9 RMS = 33.72

Intercept vrs Strip - Sta1 Oct0 Pla3 StripPar0_3

0 20 40 60 80 100 120 140 160 180

-40

-20

0

20

40

60 StripPar0_4 Nent = 0 Mean = 90.92 RMS = 42.71

Intercept vrs Strip - Sta1 Oct0 Pla4 StripPar0_4

0 20 40 60 80 100 120 140 160 180

-200 0 200 400 600 800 1000

1200

1400

1600

1800

StripPar0_5 Nent = 0 Mean = 108.6 RMS = 39.46

Intercept vrs Strip - Sta1 Oct0 Pla5 StripPar0_5