-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-0_{dpedHist_s1o0}

Nent = 960 Mean = -0.3212 RMS = 0.394 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-1_{dpedHist_s1o1}

Nent = 960 Mean = 0.1914 RMS = 0.3722 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-2_{dpedHist_s1o2}

Nent = 960 Mean = -0.3549 RMS = 0.4161 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-3_{dpedHist_s1o3}

Nent = 720 Mean = -0.3785 RMS = 0.3895 Under = 0 Over = 0 Integ = 720

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-4_{dpedHist_s1o4}

Nent = 960 Mean = -0.1915 RMS = 0.3835 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-5_{dpedHist_s1o5}

Nent = 960 Mean = -0.4094 RMS = 0.3148 Under = 0 Over = 0 Integ = 960

-30 -20 -10 0 10 20 30

1

10

10^2

10^3

Pedestal Difference for Sta-1 Oct-6_{dpedHist_s1o6}

Nent = 960 Mean = -0.6773 RMS = 2.178 Under = 64 Over = 0 Integ = 896

-30 -20 -10 0 10 20 30

1

10

10^2

Pedestal Difference for Sta-1 Oct-7_{dpedHist_s1o7}

Nent = 960 Mean = -0.04582 RMS = 0.3623 Under = 0 Over = 0 Integ = 960