0 20 40 60 80 100 -80 -60 -40 -20 0 20 40 60 80 100 120 StripPar0_0 Nent = 0 Mean = 40.06 RMS = 28.01

Intercept vrs Strip - Sta0 Oct2 Pla0 StripPar0_0

0 20 40 60 80 100

-100

-50

0

50

100 StripPar0_1 Nent = 0 Mean = 58.27 RMS = 27.29

Intercept vrs Strip - Sta0 Oct2 Pla1 StripPar0_1

0 20 40 60 80 100

-100

-50

0

50

100 StripPar0_2 Nent = 0 Mean = 37.28 RMS = 24.26

Intercept vrs Strip - Sta0 Oct2 Pla2 StripPar0_2

0 20 40 60 80 100

-150

-100

-50

0

50

100

StripPar0_3 Nent = 0 Mean = 42.04 RMS = 29.34

Intercept vrs Strip - Sta0 Oct2 Pla3 StripPar0_3

0 20 40 60 80 100 -60 -40 -20 0 20 40 60 80

StripPar0_4 Nent = 0 Mean = 40.5 RMS = 24.38

Intercept vrs Strip - Sta0 Oct2 Pla4 StripPar0_4

0 20 40 60 80 100

-120

-100 -80 -60 -40 -20 0 20

StripPar0_5 Nent = 0 Mean = 45.13 RMS = 16.72

Intercept vrs Strip - Sta0 Oct2 Pla5 StripPar0_5